Figura 1: Source: Internet Software Consortium (http://www.isc.org)

       | Survey Adjusted Replied
  Date | Host Count Host Count To Ping*
--------+-----------------------------------
Jan 2001|109,574,429 -

Jul 2000| 93,047,785 -
Jan 2000| 72,398,092 -

Jul 1999| 56,218,000 -
Jan 1999| 43,230,000 8,426,000

Jul 1998| 36,739,000 6,529,000
Jan 1998| 29,670,000 5,331,640

Jul 1997| 19,540,000 26,053,000 4,314,410
Jan 1997| 16,146,000 21,819,000 3,392,000

Jul 1996| 12,881,000 16,729,000 2,569,000
Jan 1996| 9,472,000 14,352,000 1,682,000

Jul 1995| 6,642,000 8,200,000 1,149,000
Jan 1995| 4,852,000 5,846,000 970,000

Jul 1994| 3,212,000 707,000
Jan 1994| 2,217,000 576,000

Jul 1993| 1,776,000 464,000
Jan 1993| 1,313,000